1 Table 1. Non-LTE solar heating rate conversion factor(1)

p (μbar) LTE/non-LTE z (km)(*) p (μbar) LTE/non-LTE z (km)
1.122e+02  1.007  40.0 1.045e-01  1.459  92.0
8.822e+01  1.007  42.0 7.908e-02  1.608  94.0
6.912e+01  1.007  44.0 5.984e-02  1.796  96.0
5.397e+01  1.007  46.0 4.530e-02  2.033  98.0
4.202e+01  1.008  48.0 3.430e-02  2.343 100.0
3.261e+01  1.009  50.0 2.600e-02  2.777 102.0
2.523e+01  1.013  52.0 1.973e-02  3.404 104.0
1.946e+01  1.017  54.0 1.500e-02  4.366 106.0
1.497e+01  1.021  56.0 1.145e-02  5.856 108.0
1.149e+01  1.027  58.0 8.761e-03  8.161 110.0
8.793e+00  1.033  60.0 6.731e-03  11.908 112.0
6.713e+00  1.040  62.0 5.192e-03  17.791 114.0
5.115e+00  1.047  64.0 4.024e-03  27.030 116.0
3.890e+00  1.054  66.0 3.141e-03  40.897 118.0
2.953e+00  1.061  68.0 2.478e-03  60.798 120.0
2.239e+00  1.069  70.0 1.981e-03  82.660 122.0
1.696e+00  1.078  72.0 1.601e-03  111.855 124.0
1.284e+00  1.087  74.0 1.306e-03  146.365 126.0
9.719e-01  1.099  76.0 1.076e-03  185.922 128.0
7.355e-01  1.112  78.0 8.939e-04  237.435 130.0
5.566e-01  1.129  80.0 7.462e-04  284.487 132.0
4.212e-01  1.149  82.0 6.242e-04  346.883 134.0
3.187e-01  1.174  84.0 5.234e-04  422.071 136.0
2.412e-01  1.209  86.0 4.397e-04  513.978 138.0
1.825e-01  1.263  88.0 3.702e-04  635.594 140.0
1.381e-01  1.344  90.0 1.585e-04  1961.920 150.0

(1) Due to the CO_{2} IR bands (1–4.5 μm). (*) Altitude from the V1SMED reference atmosphere.